S3Gamma Plus の操作を始めるには

ヘルプ の使い方を表示するには、F1 キーを押してください。

S3Gamma Plus に慣れていない場合は、操作方法に関する情報を参照してください。まず最初に次のトピックから始めることをお勧めします。

S3Gamma Plus では何ができるの?

S3Gamma Plus コントロール

表示を調整する


S3Gamma Plus では何ができるの?

S3Gamma Plus では、表示の暗さと明るさをいくつかの方法によって変更できます。

ガンマは、表示の明るさと暗さの各領域に影響を与えずに色だけを変更します。中間の明るさを持つ色が最も影響を受けます。

明るさ値はすべての色に対して同じように影響します。明るさ値を調整すると、画面上全体がより明るくまたはより暗くなります。

コントラストは、表示の明るい部分と暗い部分の差を変更します。コントラストが強いとは、画面の明るい部分と暗い部分との差がより大きいことを示します。

調整の各種類の違いを見分けるのに最も簡単な方法は、調整イメージを""色曲線""に設定することです。ガンマ、明るさ値、およびコントラストを変更する時に各曲線を見て、各線がどう影響するかを見ます。

次へ:コントロール


コントロール

S3Gamma Plus は、ターンダイヤルの各種コントロールを使って調整できます。

現実の世界で使用するのと同じようにターンダイアルを使います。へこみまたはくぼみの部分にカーソルを置き、左側のマウスボタンを押してドラッグします。正しい位置に置かれるとカーソルは矢印に変わり、その隣に二つの小さなターン矢印が表示されます。

また、ターンダイヤルをクリックで選択し、左または右のカーソルを使って回すこともできます。ターンダイヤルは、選択されていない場合よりも選択された時の方が明るく表示され、濃い影が付きます。

ターンダイヤルは 3 つあり、それぞれ次のような調節が可能です。ガンマ、明るさ値、およびコントラスト。ターンダイヤルを回すとターンダイヤル内の番号が変化し、変更されようとしている設定が表示されます。ターンダイヤルのデフォルト値はすべて 1.00 です。ターンダイヤルの選択時にマウスをダブル クリックするかまたはスペースを押すとデフォルトの設定に戻ります。

次へ:表示を調整する


表示を調整する

多くの調整イメージがあれば、それだけ表示に一番適した設定を決めるのに役立ちます。選択肢の中から選んで矢印をクリックして、使用したい画像をリストから選択します。

「色曲線」は元の明るさ値 (横軸) に対する調整された明るさ値 (縦軸) を簡単なグラフで表します。これはガンマ、明るさ値、およびコントラストの効果を見るのに最も適した方法です。

調整イメージは、写真イメージで表示されます。画像が ""実物""のように見えるようになるまでコントロールを調整します。

RGB カラー マップは複数の四角が広い範囲の赤、緑、および青で示されます。これらはすべてほぼ同じ明るさです。RGB カラー ランプは、赤、緑、青、白の各色の暗から明の範囲を 4 つの帯で表示します。理想的には、各帯の中でたくさんの異なる陰影が見えるのが望ましい結果です。

最後に、カラー バーと塗りつぶされた色の選択を使用することで、全色が正しくディスプレイに表示されることを確かめることができます。


このユーティリティのバージョンを表示します。


このユーティリティは、現在の設定 (色数) をサポートしていないため無効になっています。


この製品の Web ページを開くにはここをクリックしてください。


OEM または製品のロゴを表示します。


使用するビデオ アダプタをサポートしている出力 (モニタ) をすべてリストします。DuoView(TM) 機能がサポートされているアダプタでは、リストから別の出力 (例、モニタ 1 または モニタ 2) を選択して各変更をすることができます。DuoView がサポートされていないアダプタではこのリストは無効になっています。使用しているアダプタが DuoView をサポートしている場合であっても、現在マルチモニタ モードで動作している場合はこのリストは無効になります。


サポートされている色設定 (number of colors) をすべてリストし、現在選択されている色設定を表示します。色設定のためにガンマを変更するには、そのリストからモードを選択します。変更した効果を確認できるように、選択された色設定に表示が変更されます。「OK」、「適用」または「キャンセル」を選択するか、「表示プロパティ」の別のページに切り替えると、表示は元の設定に戻ります。


サポートされている表示モード (表示サイズと色数) をすべてリストし、現在選択されているモードを表示します。使用するモード用にガンマを変更するには、そのリストからモードを選択します。変更した効果を確認できるように、選択されたモードに表示が変更されます。「OK」、「適用」または「キャンセル」を選択するか、「表示プロパティ」の別のページに切り替えると、表示は元の設定に戻ります。


現在の表示モードを表示します。このモードはガンマ調整の結果の影響を受けます。例えば、"16 ビット カラー" のモードが表示された場合、ガンマ調整は 16 ビットの色すべてに影響を与えます。表示されたモードに解像度と表示色 ("1024 x 768 x 16" など) がある場合、実行するガンマ調整はその解像度と表示色に限定して適用されます。


色曲線または調整ピクチャでは、表示ガンマを調整ができます。下のドロップダウン リストを使って、ここに表示するピクチャの種類を選択します。最適の結果を得るには、同じ色のそれぞれ異なる陰影の違い (RGB カラー ランプがこれに適しています) が見えるようにガンマ設定をする必要があります。


表示可能な調整ピクチャのリストを表示します。色曲線 はガンマ調整に対応して曲線で表すもので、横軸は望ましい色値を示し、縦軸は実際に出力される値を示します。調整イメージは赤、緑、青の範囲を持つ写真イメージです。カラー ランプは、さまざまな色の暗から明への陰影のセレクションを示し、コントラストの調整に最適です。他のセレクションはカラー ランプまたは塗色を表示します。


表示ガンマを調整できるコントロールが含まれています。各コントロールには個別にヘルプ機能があります。ダイアログの一番上にある ? をクリックし、次に知りたい情報の項目をクリックします。


変更した内容が表示の赤のコンポーネントに適用されるようにするにはこのボタンを選択します。


変更した内容が表示の緑のコンポーネントに適用されるようにするにはこのボタンを選択します。


変更した内容が表示の青のコンポーネントに適用されるようにするにはこのボタンを選択します。


赤、緑、青の各色にリンクさせるにはこのボタンと選択します。リンクされている時は、ガンマ、明るさ値、またはコントラストを調整するとディスプレイの赤、緑、青の各コンポーネントはすべて一緒に変ります。このボタンが選択されていない時は、赤、緑、青の各色は別々に調整できます。


選択された単色または複数色のガンマ (ディスプレイの明るさ値の曲線度を高低で示した幅) をコントロールします。ガンマの量を増やすには右回りに、減らすには左回りにダイヤルを回します。デフォルトのガンマ値に戻すにはこのダイヤルをダブルクリックします。


選択され単色または複数色の明るさ値 (すべてを明るくまたは暗く) をコントロールします。明るさ値を増やすには右回りに、減らすには左回りにダイヤルを回します。デフォルトの明るさ値に戻すにはこのダイヤルをダブルクリックします。


選択された単色または複数色のコントラスト (明色と暗色の差を増減する) をコントロールします。明るさ値を増やすには右回りに、減らすには左回りにダイヤルを回します。デフォルトのコントラスト値に戻すにはこのダイヤルをダブルクリックします。


ディスプレイの赤の部分については、「調整」ドロップダウン リストで選択されている項目によって、ガンマ、明るさ値、またはコントラストをコントロールします。値を増やすには右回りに、減らすには左回りにダイヤルを回します。デフォルトの値に戻すにはこのダイヤルをダブルクリックします。


ディスプレイの緑の部分については、「調整」ドロップダウン リストで選択されている項目によって、ガンマ、明るさ値、またはコントラストをコントロールします。値を増やすには右回りに、減らすには左回りにダイヤルを回します。デフォルトの値に戻すにはこのダイヤルをダブルクリックします。


ディスプレイの青の部分については、「調整」ドロップダウン リストで選択されている項目に応じてガンマ、明るさ値、またはコントラストをコントロールします。値を増やすには右回りに、減らすには左回りにダイヤルを回します。デフォルトの値に戻すにはこのダイヤルをダブルクリックします。


ターンダイヤルの調整時に影響を受けるカラー チャンネルを表示します。赤、緑、または青が選択されている時は、ガンマ、明るさ値、またはコントラストを調整するとディスプレイ上の選択されている部分だけが変ります。"RGB のリンク" を選択すると全色 (赤、緑、および青) が同時に影響を受けます。


異なるカラー チャンネルに対して実行できる各種調整を表示します。ガンマ、明るさ値、またはコントラストを選択すると、各ターンダイヤルはガンマ、明るさ値、またはコントラストに対してだけ影響を与え、それぞれ各色 (赤、緑、青) を別々にコントロールします。


現在選択されているモードに対するガンマ、明るさ値、およびコントラストの調整をデフォルトに戻して赤、緑、および青の各色にリンクします。これはデフォルトの設定で、ビデオ出力にはガンマ調整は適用されていません。


ガンマ スキームの選択、保存、および削除が可能な各コントロールが含まれています。各コントロールには個別にヘルプ機能があります。ダイアログの一番上にある ? をクリックし、次に知りたい情報の項目をクリックします。


現在のガンマ設定を保存します。入力される名前が「スキーム」リストに表示され、簡単に選択して設定を元に戻すことができます。


「スキーム」ボックスで選択されたスキームを削除します。


システムに適用されているガンマ調整を変更できるスキームをリストします。スキームは、赤、緑、青に対して適用できるガンマ、明るさ値、およびコントラストの調整を保存します。スキームを使用するには、このリストから名前を選択します。すべてのガンマ設定をデフォルトに戻すには、"(デフォルト)" というスキームを選択します。


現在のガンマ設定のための名前を入力する場所を提供します。後で簡単に設定を元に戻すことができるように、入力した名前が「スキーム」リストに表示されます。


フル スクリーン モードに入るにはこれをクリックします。フル スクリーン モードでは調整パターンの表示領域はデスクトップ全体をカバーされ、見やすいようにパターンが大きく表示されます。または、フル スクリーン モードにはヘルプはありません。フル スクリーン モードを解除するには"Esc" キーを押します。


著作権情報

ｩ Copyright 2001 S3 Graphics, Inc. すべての権利は留保されています。S3、DuoView, Streams Processor、 Savage、Savage4、ProSavage、SuperSavage、および Twister は S3 Graphics Inc. の登録商標です。