ข้อมูลระบบ: แสดงประเภทของชิป เวอร์ชั่นของ BIOS ขนาดของหน่วยความจำจอภาพ (เป็น MB) และข้อมูลอื่น ๆ เกี่ยวกับฮาร์ดแวร์


ข้อมูลเกี่ยวกับไดรเวอร์: แสดงข้อมูลเวอร์ชั่นเกี่ยวกับไฟล์ไดรเวอร์ต่างๆ


แสดงชื่อและเวอร์ชั่นของไดรเวอร์จอภาพ


แสดงเวอร์ชั่นของไดรเวอร์ DirectDraw


แสดงเวอร์ชั่นของไดรเวอร์มินิพอร์ต


แสดงเวอร์ชั่นของไดรเวอร์มินิ-VDD


แสดงเวอร์ชั่นของไดรเวอร์ OpenGL ที่ไคลแอนท์ติดตั้งได้


แสดงเวอร์ชั่นของไฟล์ MeTaL DLL


แสดงเวอร์ชั่นของไดรเวอร์ MCI เพลย์แบค


แสดงระดับของ DirectX ที่ใช้กับไดรเวอร์นี้ได้


ข้อมูล DirectX: แสดงข้อมูลเวอร์ชั่นเกี่ยวกับ DirectX และรันไทมโมดูลของ DirectX Media


แสดงเวอร์ชั่นของยูติลิตี้นี้


คลิ๊กที่ที่เพื่อเปิดเว็บไซต์ของผลิตภัณฑ์นี้


แสดงโลโกของ OEM หรือผลิตภัณฑ์


แสดงลโกของบริษัท


จำนวน RAM ที่ติดตั้งในระบบ ซึ่งจะรวมหน่วยความจำที่ใช้เพื่อเป็นหน่วยความจำบัฟเฟอร์ของภาพ


จำนวนหน่วยความจำที่ใช้แสดงภาพ ในระบบภาพที่ใช้หน่วยความจำร่วมนั้น หน่วยความจำเหล่านี้มาจากหน่วยรวมจำรวมของระบบ


จัดสรรส่วนหนึ่งของหน่วยความจำที่มีอยู่เพื่อใช้เป็นบัฟเฟอร์ภาพอย่างเดียว หน่วยความจำที่จัดสรรเพื่อระบบปฏิบัติการจะลดลงเท่ากับจำนวนที่ได้จัดสรรไป


จัดสรรส่วนหนึ่งของหน่วยความจำที่มีอยู่เพื่อใช้เป็นบัฟเฟอร์ภาพอย่างเดียว หน่วยความจำที่จัดสรรเพื่อระบบปฏิบัติการจะลดลงเท่ากับจำนวนที่ได้จัดสรรไป  ต้องสตาร์ทระบบอีกครั้งเพื่อให้ค่าที่เปลี่ยนแปลงมีผล


คลิ๊กที่นี่เพื่อเปิดไดอะล็อกเพื่อปรับแต่งค่าประหยัดพลังงานของจอภาพที่ได้เซ็ทไว้


คลิ๊กที่นี่เพื่อให้ไดรเวอร์จอภาพควบคุมพลังงานโดยอัตโนมัติ เมื่อเช็คช่องนี้แล้ว สไลเดอร์พลังงานจะจะไม่แสดงระดับพลังงานที่ใช้อย่างแท้จริง ให้เลิกเช็คช่องนี้เพื่อเลือกระดับพลังงานโดยการใช้สไลเดอร์


เมื่อไม่เช็คค่า “ดีฟอลท์” แล้ว ให้ใช้สไลเดอร์มาเลือกโหมดประหยัดพลังงานที่อะแดปเตอร์ควรใช้ เมื่อเลือก “พลังงาน” แล้วจะประหยัดพลังงานได้มากกว่า แต่อาจทำให้สร้างภาพกราฟิก 3D ได้ช้าลง เมื่อเลือก “ความเร็ว” แล้วจะสร้างภาพกราฟิก 3D ได้เร็วขึ้น แต่จะสิ้นเปลืองพลังงานมากขึ้น