Hjelp for S3DuoVue


Turns on the CRT only.


Turns on the LCD only.


Turns on the DFP only.


Turns on the TV only.


Turns on the 2nd CRT only.


Turns on both the LCD and the CRT.


Turns on both the DFP and the CRT.


Turns on both the LCD and the TV.


Turns on both the DFP and the TV.


Turns on both the LCD and the 2nd CRT.


Turns on both the DFP and the 2nd CRT.


Turns on both the CRT and the TV.


Turns on both the CRT and the 2nd CRT.


Turns on all the display devices.


Skjermenheter: Vis og velg de aktive skjermenhetene. En aktiv skjermenhet kan være en CRT-skjerm, et TV-apparat eller begge deler.


CRT: Merk denne for å aktivere CRT-skjermen.


TV: Merk denne for å slå på skjermen på TV-apparatet.


LCD: Velg denne for å slå på LCD-skjermen.


DFP:  Velg denne for å slå på DFP-skjermen.


CRT 2:  Velg denne når du har to CRT-skjermer og vil slå på skjermen til den andre.


LCD-bilde: Viser status for LCD-skjermen. Hvis LCD-skjermen ikke er tilkoblet, vises en blank skjerm. Hvis LCD-skjermen er tilkoblet, men ikke aktiv, vises en blank skjerm. Hvis LCD-skjermen er tilkoblet og aktiv, vises et bilde av skrivebordet.


DFP-bilde: Viser status for DFP-skjermen. Hvis DFP-skjermen ikke er tilkoblet, vises en blank skjerm. Hvis DFP-skjermen er tilkoblet, men ikke aktiv, vises en blank skjerm. Hvis DFP-skjermen er tilkoblet og aktiv, vises et bilde av skrivebordet.


CRT2-bilde: Viser status for den andre av to CRT-skjermer. Hvis skjermen ikke er tilkoblet, vises en blank skjerm. Hvis skjermen er tilkoblet, men ikke aktiv, vises en blank skjerm.  Hvis skjermen er tilkoblet og aktiv, vises et bilde av skrivebordet.


CRT-bilde: Viser status for CRT-skjermen. Hvis skjermen ikke er tilkoblet, vises en blank skjerm. Hvis skjermen er tilkoblet, men ikke aktiv, vises en blank skjerm. Hvis skjermen er tilkoblet og aktiv, vises et bilde av skrivebordet.


TV-bilde: Viser status for TV-apparatet.  Hvis TV-apparatet ikke er tilkoblet, vises en blank skjerm.  Hvis TV-apparatet er tilkoblet, men ikke aktivt, vises en blank skjerm. Hvis TV-apparatet er tilkoblet og aktivt, vises et bilde av skrivebordet.  Hvis gjeldende skjermoppløsning ikke støtter utdata fra TV-apparatet, vises en blank skjerm, og denne blir fremstilt med en rød sirkel og en skråstrek over.


Bruk CRT DDC-informasjon: Hvis denne er merket, og en DDC CRT-skjerm er tilkoblet, vil innstillingene under Egenskaper for skjerm bare vise modiene og oppfriskningsfrekvensene som  DDC CRT-skjermen kan støtte. Hvis denne ikke er merket, er det ingen begrensning på hvilke egenskaper som vises. Du bør da være forsiktig med å skifte til ny modus eller oppfriskningsfrekvens. Bruk "Test"-funksjonen før du bekrefter med  "Bruk" eller "OK".


CRT-innstillinger:  Klikk på denne for å vise siden med innstillingene for CRT-skjermen.


LCD-innstillinger:  Klikk på denne for å vise siden med innstillingene for LCD-skjermen.


DFP-innstillinger:  Klikk på denne for å vise siden med innstillingene for DFP-skjermen.


TV-innstillinger:  Klikk på denne for å vise siden med innstillingene for TV-skjermen.


CRT 2-innstillinger:  Klikk på denne for å vise siden med innstillingene for den andre CRT-skjermen.


Klikk på denne for å åpne websiden for dette produktet.


Informasjon:  Klikk på denne for å vise informasjonsskjermbildet. Dette viser utgivelsesdato og versjonsnummer for BIOS og skjermdrivere, og versjonsnummer for dette programmet.


TV-innstillinger: Viser gjeldende type og utdatasignal for det tilkoblede TV-apparatet.


TV-type: Viser gjeldende type for det tilkoblede TV-apparatet (NTSC, PAL, PAL-M eller NTSC Japan).


TV-utdatasignal: Viser gjeldende signaltype for utdata fra det tilkoblede TV-apparatet (Komponent, Composite Video eller S-Video).


TV-kontroll: Lar brukeren justere TV-apparatets lysstyrke, kontrast, farge og nyanse.


Lysstyrkekontroll: Lar brukeren justere TV-apparatets  lysstyrke med glidebryteren. Denne kan reguleres fra minste til største lysstyrke.


Kontrastkontroll: Lar brukeren justere TV-apparatets  kontrast med glidebryteren. Denne kan reguleres fra laveste til høyeste kontrast.


Fargekontroll: Lar brukeren justere TV-apparatets  farge med glidebryteren. Denne kan reguleres fra minimum til maksimum farge.


Nyansekontroll: Lar brukeren justere TV-apparatets  fargenyanse med glidebryteren. Denne kan reguleres fra grønn til fiolett.


Standard-knapp: Klikk på denne knappen hvis du vil bruke standardverdiene i BIOS for lysstyrke, kontrast, farge og nyanse.


Flimrefilter:   Viser tilstanden til TV-apparatets gjeldende flimrefilter. Flimrefilteret forbedrer kvaliteten på grafikk som vises på TV-skjermen.


Flimrefilter:   Viser tilstanden til TV-apparatets gjeldende flimrefilter. Flimrefilteret forbedrer kvaliteten på grafikk som vises på TV-skjermen.


Flimrefilter-bryter:  Regulerer i hvor stor grad flimrefilteret brukes. Glidebryteren kan justere flimrefilteret fra minimum til maksimum flimrefilter.


Skarphet: Dynamisk kontroll som forsterker samlet kantkontrast i forhold til flimrefilterets innstilling.


Skarphets-bryter: Øker eller reduserer skarpheten som systemet bruker, fra minimum skarphet til maksimum skarphet.


TV-justering: Viser siden hvor TV-bildets posisjon og størrelse kan justeres.


Show S3 TV Taskbar Icon : If checked, the S3 TV taskbar icon for TV position adjustment will be accessible in the Windows taskbar.


TV-justering-bilde:  Viser hvordan gjeldende innstillinger for størrelse og posisjon for TV-bildet vil se ut på TV-skjermen.


Testmønster: Klikk på denne hvis du vil gå gjennom testmønstrene for å justere innstillingene for TV-apparatets utdata.


Vannrett/loddrett størrelse: Justerer bredden og høyden på bildet som vises på TV-skjermen.


Knapper for vannrett/loddrett størrelse: Venstre- og høyrepilene øker eller reduserer den vannrette størrelsen slik at TV-bildet blir bredere eller smalere. Opp- og nedpilene øker eller reduserer den loddrette størrelsen slik at TV-bildet blir høyere eller lavere. Klikk på knappen i midten hvis du vil bruke standardverdiene fra BIOS for TV-bildets høyde og bredde.


TV-posisjon:  Justerer bildets posisjon på TV-skjermen.


Knapper for TV-posisjon: Klikk på pilene i ønsket retning hvis du vil endre bildets posisjon på TV-skjermen. Klikk på knappen i midten hvis du vil bruke standardinnstillingen for posisjon.


Lås sideforhold:  Merk denne hvis du vil låse TV-visningsområdet i et 4:3-sideforhold. Bare den loddrette størrelsen kan justeres når sideforholdet er låst.


Innstillinger for korrigering av maskeåpning-knapp:  Klikk på denne for å vise dialogboksen med kontroller for korrigering av maskeåpning.


Omvendt korrigering av maskeåpning:  Hvis denne ikke er merket, blir Korrigering av maskeåpning fastsatt  for å forbedre den generelle grafikken og teksten i Windows. Hvis denne er merket, blir Omvendt korrigering av maskeåpning fastsatt for å forbedre flimrefiltrert grafikk og tekst i DOS-modus.


Korrigering av maskeåpning:  Korrigering av maskeåpning forsterker bildedetaljene når flimrefilteret er aktivt.


Korrigering av maskeåpning-glidebryter: Øker eller reduserer graden av Korrigering av maskeåpning, fra mer forsterking av bildedetaljer til mindre forsterking av bildedetaljer.


Nedre grenseverdi for korrigering av maskeåpning: Graden av korrigering av maskeåpning trekkes fra verdien for lysstyrken hvis den er under denne nedre grensen. Fortegnet for Korrigering av maskeåpningen blir snudd når Omvendt korrigering av maskeåpning er merket.


Nedre grenseverdi for korrigering av maskeåpning-glidebryter: Øker eller reduserer graden av korrigering av maskeåpning ved nedre grenseverdi.


Midtre grenseverdi for korrigering av maskeåpning: Graden av korrigering av maskeåpning legges til lysstyrkens verdi hvis den er mellom nedre grenseverdi og midtre grenseverdi. Hvis den er mellom midtre grenseverdi og øvre grenseverdi blir den trukket fra lysstyrkens verdi. Fortegnet for Korrigering av maskeåpningen blir snudd når Omvendt korrigering av maskeåpning er merket.


Midtre grenseverdi for korrigering av maskeåpning-glidebryter: Øker eller reduserer graden av korrigering av maskeåpning ved midtre grenseverdi.


Øvre grenseverdi for korrigering av maskeåpning: Graden av Korrigering av maskeåpning legges til lysstyrkens verdi hvis den er høyere enn øvre grense. Fortegnet for Korrigering av maskeåpningen blir snudd når Omvendt korrigering av maskeåpning er merket.


Øvre grenseverdi for korrigering av maskeåpning-glidebryter: Øker eller reduserer graden av korrigering av maskeåpning ved øvre grenseverdi.


Standard-knapp: Klikk på denne hvis du vil bruke standardinnstillingene i BIOS for Korrigering av maskeåpning, Nedre grense for korrigering av maskeåpning, Midtre grense for korrigering av maskeåpning og Øvre grense for korrigering av maskeåpning.


Grafikkortinformasjon:  Viser brikketype, størrelsen på skjermminnet (MB) og BIOS-versjonen.


Driverinformasjon: Viser driverens versjonsnumre og  utgivelsesdatoer.


VPM-driverinformasjon: Viser VPM-driverens versjonsnummer og utgivelsesdato.


Programinformasjon: Viser versjonsnummeret til dette programmet. Hvis en ressursfil er i bruk, vises også navnet på denne.


CRT-oppløsning: Viser gjeldende størrelse på CRT-synsfeltet. Dette kan brukes til å innstille størrelsen på synsfeltet i panoreringsmodusen.


CRT-oppløsning: Viser gjeldende størrelse på CRT-synsfeltet. Dette kan brukes til å innstille størrelsen på synsfeltet i panoreringsmodusen.


Øker eller minsker informasjonsmengden på skjermen.


Dette er gjeldende CRT-skjermstørrelse.


CRT-oppdatering (Hz): Denne oppdateringsfrekvensen for CRT kan velges, avhengig av kapasiteten til den aktuelle CRT.


Velg oppdateringsfrekvensen for CRT fra denne listen.


Når en ikke-DDC-skjerm er tilkoplet, er oppløsningen og oppdateringsfrekvensen innstilt på 640x480, 60 Hz; når en DDC-skjerm er tilkoplet, vises de gyldige oppløsningene og oppdateringsfrekvensene som skjermen gir, på denne siden. Hvis du vil overstyre skjermkapasiteten og vise alle oppløsninger og oppdateringsfrekvenser, merker du av i denne boksen.

Merk: Noen skjermer kan skades hvis du velger feil oppløsning eller oppdateringsfrekvens. Du bør bare bruke innstillinger som du vet at skjermen støtter.


Viser paneltypen (LCD): STN eller TFT.


Viser den fysiske skjermstørrelsen til panelet (LCD).


LCD-utvidelse: Kildebildet kan midtstilles eller utvides når skrivebordsoppløsningen er mindre enn paneloppløsningen (LCD).


Midtstill: Velg dette for å midtstille skrivebordskildebildet på panelet. (Standard).


Utvid:  Velg dette for å utvide skrivebordskildebildet på panelet.