S3Display の操作を始めるには

ヘルプ の使い方を表示するには、F1 キーを押してください。

S3Display に慣れていない場合は、操作方法に関する情報を参照してください。まず最初に次のトピックから始めることをお勧めします。

S3Display では何ができるの?

S3Display コントロール

表示を切り替える


S3Display では何ができるの?

S3Display では、表示用デバイスの切り替えとそれらの設定をそれぞれ調整することができます。どのデバイスをオン/オフにするかは実際にシステムに接続されているデバイスに依存しますが、例えば次のようなデバイスが含まれます。

CRT - これは標準モニタです。CRT では特に調整すべき設定はありません。

LCD - これはラップトップに組み込まれる表示パネルで、デスクトップのシステムでは表示されません。LCD に設定すると、使用している LCD で可能な限り表示を拡大することができます。

DVI - これはデジタル ビデオ インターフェース パネルで、フラット パネルとも呼ばれます通常は CRT と同様に接続され、代替として使用されます。設定項目は LCD と同じ種類の項目が用意されています。

TV - これは標準のテレビセットです。TV 設定では、TV の種類 (NTSC または PAL など) を変更することができます。ビデオのチップセットによっては、システムから TV (コンポジットまたは S-ビデオ) への接続に使用するポート用の設定が必要な場合があります。最後に、「詳細」ボタンでは TV 画面の表示品質の改善に必要なその他の設定を変更できます。

次へ:コントロール


コントロール

S3Display には、コントロールの基本セットが 2 つあります。一番上には異なる表示をオン/オフできる「表示デバイス」があります。また、デバイスの設定を変更する場合にも「表示デバイス」を使ってデバイスを選択します。デバイスの設定は一番下のボックスにあります。

表示デバイス:システムがサポートしている表示デバイスすべてがこのボックスに表示されます。各デバイスに関する重要な情報が一目でわかります。まず第一に、そのデバイスの状態がオンか、オフか？デバイスのアイコンがミニチュアのデスクトップを表示している時は、その装置はオンの状態です。反対にそのデバイスが黒っぽい四角を表示している時は、オフの状態です。デバイスの画像の下にあるチェックボックスには同じ情報が表示されます。二番目に、デバイスが使用中のシステムに接続されているかどうかが確認できます。デバイスが接続されていない時は、赤字の大きな X と小さなコネクタの画像がデバイスの画像の上に表示され、そのデバイスは薄い灰色で選択できない状態になっています。

デバイスのオン/オフを切り替えるには、デバイスの画像の下にあるチェックボックスをクリックします。デバイスを選択してその設定を表示させるには、そのデバイスのピクチャを選択します。

デバイスの設定:このボックスには、選択されたデバイスについて変更できる各種の設定が表示されます。

次へ:表示を切り替える


表示を切り替える

使用しないデバイスをオフにし、使用したいデバイスをオンにすることで表示デバイスを切り替えられます。デバイスによっては同時にオンの状態にできない場合がありますので注意してください。使用したいデバイスが稼働可能な状態にならない時は、別のデバイスを先にオフにして見てください。

デバイスのオン/オフを切り替えるには、そのデバイスの画像の下にあるチェック ボックスをクリックします。チェックが付いている時はそのデバイスがオンの状態であることを示します。チェックボックスがクリアされている時はそのデバイスがオフの状態であることを示します。変更作業が済んだら、「適用」を選択します。この時点で、選択した内容についての確認を求められます。「OK」を選択して次に進みます。少しの間表示がちらつく場合がありますが、しばらくすると新しく選択された各デバイスが有効になります。新しい設定が気に入らない、または表示が正しくない場合は 15 秒程そのまま待つと前の設定に戻ります。設定に問題がなければ、「はい」を選択して新しい設定を確定します。


このユーティリティのバージョンを表示します。


この製品の Web ページを開くにはここをクリックしてください。


OEM または製品のロゴを表示します。


コントローラのオプション:表示コントローラの状態について、「シングル」または「デュアル」のどちらかを選択します。


シングル:システムがシングル コントローラ モードに設定されている時は、ホットキーはシングル コントローラのリスト内の各モードで順番に切り替わります。


デュアル:システムがデュアル コントローラ モードに設定されている時は、ホットキーはデュアル コントローラのリスト内の各モードで順番に切り替わります。


サポートされているデバイスの組み合わせをすべてリストします。別のセットのデバイスを使用するには、希望の組み合わせをリストから選択します。


表示デバイス:アクティブな表示デバイスを表示して選択します。アクティブな表示デバイスは、CRT、TV、LCD、または DVI から 1 つ以上の組み合わせになります。デバイスを選択するにはそのデバイスの画像をクリックし、そのデバイスを有効または無効にするにはチェック ボックスをクリックします。


デバイス:デバイスのステータスを表示します。詳細については、各デバイスを右クリックしてください。


CRT:CRT のステータスを表示します。CRT が接続されていない時は、CRT の画像とチェック ボックスは薄い灰色で選択できない状態になります。接続されていてもアクティブでない時は、CRT の画像は模様なしのスクリーンを表示します。接続されたアクティブな CRT 表示は、デスクトップを示します。


LCD:LCD のステータスを表示します。LCD が接続されていない時は、LCD の画像とチェック ボックスは薄い灰色で選択できない状態になります。接続されていてもアクティブでない時は、LCD の画像は模様なしのスクリーンを表示します。接続されているアクティブな LCD 表示は、デスクトップを示します。


DVI:DVI のステータスを表示します。DVI が接続されていない時は、DVI の画像とチェック ボックスは薄い灰色で選択できない状態になります。接続されていてもアクティブでない時は、DVI の画像は模様なしのスクリーンを表示します。接続されているアクティブな DVI 表示は、デスクトップを示します。


テレビ:テレビのステータスを表示します。テレビが接続されていない時は、テレビ画像とチェック ボックスは薄い灰色で選択できない状態になります。接続されていてもアクティブでない時は、テレビ画像は模様なしのスクリーンを表示します。接続されたアクティブなテレビは、デスクトップを表示します。テレビの調整機能にすばやくアクセスするには、テレビを右クリックします。


CRT 2:セカンダリ CRT のステータスを表示します。CRT が接続されていない時は、CRT の画像とチェック ボックスは薄い灰色で選択できない状態になります。接続されていてもアクティブでない時は、CRT の画像は模様なしのスクリーンを表示します。接続されたアクティブな CRT 表示は、デスクトップを示します。


デバイスの設定: 現在選択されているデバイスに利用できる設定を表示します。利用できる設定は各デバイスの種類によって異なる場合があり、デバイスによっては調整可能な設定がないこともあります。


テレビの種類:NTSC、NTSC Japan、または PAL など、サポートされているテレビのスタンダードをリストします。別のテレビ スタンダードを使用するには、希望のスタンダードをリストから選択します。


テレビ出力:コンポジットまたは S-Video など、サポートされている テレビ出力コネクタをリストします。別のテレビ コネクタを使用するには、希望のコネクタをリストから選択します。


詳細:選択されたデバイスの「プロパティ」画面を開くにはここをクリックしてください。


サイズ:CRT 画像の水平のサイズを増減するには、右または左の マイナス( - ) または プラス ( + ) をクリックします。CRT の画像の高さの調節をするには、上、下、プラス( + )、またはマイナス( - ) のマークを上と下にクリックします。CRT 画像のサイズをデフォルトの値に設定するには中央のボタンをクリックします。


このデバイスには、調整できる設定はありません。


位置:CRT 画面に表示されている画像の位置を移動するには、ボタンの向いている方向に矢印をクリックします。デフォルト設定の位置に指定するには中央のボタンをクリックします。.


テスト パターン:CRT のサイズと位置を調整するには、これをクリックして各テスト パターンを順番に切り替えます。


パネル画像の拡大:現在選択されているパネル (LCD または DVI) 上にあるデスクトップ ソースの画像を拡大するには、これをチェックします。デスクトップをパネル上の中央に配置するにはこのチェックを外します。


パネルの種類:現在選択されているパネルの種類と物理的な画面サイズを表示します。


タスク バーにトレー アイコンを表示する:システム トレー エリアでアイコンを表示するにはこれをチェックします。S3Display の機能にすばやくアクセスするには、トレー アイコンを右クリックします。また、トレー アイコンは Windows 起動時に自動的に読み込まれます。トレーアイコンを削除するにはこのチェックを外して Windows 起動時に読み込まれないようにします。


ちらつき防止フィルタ:テレビ出力用のちらつき防止フィルタをオンにするにはこれをチェックします。ちらつき防止フィルタは、テレビに表示される画像の品質を改善します。


ちらつき防止フィルタ スライダ:システムが使用するフィルタ機能の量を、最小 (一番左) から最大 (一番右) までの間で増減できます。


鮮明度:ちらつき防止フィルタの使用時にエッジのコントラストの機能をオンにするには、これをチェックします。


鮮明度スライダ:システムが使用する鮮明度の量を増減できます。


明るさ値:テレビ出力の明るさ値を暗 (一番左) から明 (一番右) の間で設定するには、スライダをドラッグします。


コントラスト:テレビ出力のコントラストを最小 (一番左) から最大 (一番右) の間で設定するには、スライダをドラッグします。


色:テレビ出力の色または鮮やかさのレベルを最小 (一番左) から最大 (一番右) の間で設定するには、スライダをドラッグします。


濃淡:テレビ出力の濃淡または色合いを緑 (一番左) から紫 (一番右) の間で設定するには、スライダをドラッグします。


テレビ画像:現在設定されているテレビのサイズと位置が、テレビ画面上でどのように見えるかを表示します。


サイズ:TV 画像の水平のサイズを増減するには、右または左の マイナス( - ) または プラス ( + ) をクリックします。TV の画像の高さの調節をするには、上、下、プラス( + )、またはマイナス( - ) のマークを上と下にクリックします。TV 画像のサイズをデフォルトの値に設定するには中央のボタンをクリックします。


位置:TV 画面に表示されている画像の位置を移動するには、ボタンの向いている方向に矢印をクリックします。デフォルト設定の位置に指定するには中央のボタンをクリックします。.


縦横比の固定:テレビ画面の領域を 4:3 の縦横比に固定します。この場合、調整が可能なのは縦サイズだけです。.


テスト パターン:テレビ出力の設定を調整するには、これをクリックして各テスト パターンを順番に切り替えます。


デフォルト:表示されているテレビの各設定を、すべてデフォルトの値に戻すにはこれをクリックします。


回転: クリックすると画面方向のページが開きます。


サンプルイメージ: 選択された画面方向の例をサンプルイメージとして示します。


回転: 利用できる回転モードから選んでください。


標準: 標準状態に戻します。


90度: 90度回転させる場合に選択します。ディスプレイは標準状態から時計回りに90度回転します。


180度: 180度回転させる場合に選択します。ディスプレイは標準状態から時計回りに180度回転します。


270度: 270度回転させる場合に選択します。ディスプレイは標準状態から時計回りに270度回転します。


著作権情報

S3、S3 ON BOARD、S3d (デザインとワード)、Trio および ViRGE は S3 Incorporated の登録商標です。S3 Corporate Logo、 Sight. Sound. Speed.、Trio64V2、Savage、Savage3D、Savage4、Savage 2000、DuoView、 および Streams Processor は S3 Incorporated の商標です。