このグループには、項目毎にヘルプがあります。ダイアログボックスの右上の [image] をクリックし、目的の項目をクリックしてください。


標準で使うマウスのボタンを左ボタンに設定します。通常は、右手の人指し指でこのボタンをクリックします。


標準で使うマウスのボタンを右ボタンに設定します。通常は、左手の人指し指でこのボタンをクリックします。


現在の設定によるマウスの左右のボタンの機能が表示されます。


現在の設定によるマウスの左右のボタンの機能が表示されます。


現在の設定によるマウスの左右のボタンの機能が表示されます。


現在の設定によるマウスの左右のボタンの機能が表示されます。


現在の設定によるマウスの左右のボタンの機能が表示されます。


現在の設定によるマウスの左右のボタンの機能が表示されます。


このグループには、項目毎にヘルプがあります。ダイアログボックスの右上の [image] をクリックし、目的の項目をクリックしてください。


標準で使うマウスのボタンをダブルクリックする時の間隔を調整します。マウスの使い方になれていない場合は、つまみを左へドラッグすると、ダブルクリックしやすくなることがあります。ダブルクリックの速度をテストするには、つまみの右の絵をダブルクリックします。(注)ダブルタップは固定間隔です。


標準で使うマウスのボタンをダブルクリックする時の間隔を調整します。マウスの使い方になれていない場合は、つまみを左へドラッグすると、ダブルクリックしやすくなることがあります。ダブルクリックの速度をテストするには、つまみの右の絵をダブルクリックします。(注)ダブルタップは固定間隔です。


標準で使うマウスのボタンをダブルクリックする時の間隔を調整します。マウスの使い方になれていない場合は、つまみを左へドラッグすると、ダブルクリックしやすくなることがあります。ダブルクリックの速度をテストするには、つまみの右の絵をダブルクリックします。(注)ダブルタップは固定間隔です。


マウスのダブルクリックの速度をテストする場所です。ダブルクリックが認識されると、花が咲いたり、芽だけになったりします。


マウスのダブルクリックの速度をテストする場所です。ダブルクリックが認識されると、花が咲いたり、芽だけになったりします。


現在表示されている設定項目の全てを、標準的な設定に戻します。


このグループには、項目毎にヘルプがあります。ダイアログボックスの右上の [image] をクリックし、目的の項目をクリックしてください。


マウスポインタが画面を移動する速度を調整します。


マウスポインタが画面を移動する速度を調整します。


マウスポインタが画面を移動する速度を調整します。


このグループには、項目毎にヘルプがあります。ダイアログボックスの右上の [image] をクリックし、目的の項目をクリックしてください。


マウスポインタの軌跡を表示し、液晶画面でポインタが見やすくなるようにします。軌跡の長さを変えるには、左のつまみをドラッグします。


マウスポインタの軌跡の長さを調整します。この設定が変更できない場合は、[表示する]チェックボックスがオンになっているかどうかを確かめてください。


マウスポインタの軌跡の長さを調整します。この設定が変更できない場合は、[表示する]チェックボックスがオンになっているかどうかを確かめてください。


マウスポインタの軌跡の長さを調整します。この設定が変更できない場合は、[表示する]チェックボックスがオンになっているかどうかを確かめてください。


このグループには、項目毎にヘルプがあります。ダイアログボックスの右上の [image] をクリックし、目的の項目をクリックしてください。


操作面を軽くたたいて指をすぐに離すことをタップと言います。タップを行った時、右利きの場合は左ボタンクリック、左利きの場合は右ボタンクリックと同様の機能が得られます。タップ機能はフラットパッドとタッチパネルで有効です。


タッピングを2回連続してタップすることにより、ボタンをダブルクリックした時と同様の機能が得られます。タブルタップ機能はフラットパッドとタッチパネルで有効です。


操作面をすばやくタップした後、すぐ続けて操作面をなぞると、ボタンによるドラッグと同様な機能が得られます。ドラッグ機能はフラットパッドで有効です。


ドラッグした後、操作面から指を離してもドラッグ状態を保持します。ドラッグを解除したいときは、再度タップしてください。ドラッグロック機能はフラットパッドで有効です。


タイマーよるドラッグロックの解除を設定します。タイマー時間を設定する場合は、下のつまみをドラッグします。


ドラッグロックが解除するまでの時間を調整します。つまみを右にもっていく程、解除するまでの時間が長くなります。


ドラッグロックが解除するまでの時間を調整します。つまみを右にもっていく程、解除するまでの時間が長くなります。


ドラッグロックが解除するまでの時間を調整します。つまみを右にもっていく程、解除するまでの時間が長くなります。


ドラッグロックが解除するまでの時間を調整します。つまみを右にもっていく程、解除するまでの時間が長くなります。


このグループには、項目毎にヘルプがあります。ダイアログボックスの右上の [image] をクリックし、目的の項目をクリックしてください。


キーボードを使っている時、最後のキー入力から一定時間の間、誤って入力されたタップを無効にします。無効にする時間を設定するには、下のつまみをドラッグします。


タップOFFにする時間を調整します。つまみを右にもっていく程、無効になる時間が長くなります。


タップOFFにする時間を調整します。つまみを右にもっていく程、無効になる時間が長くなります。


タップOFFにする時間を調整します。つまみを右にもっていく程、無効になる時間が長くなります。


スクロールバーを操作せずに、フラットパッドの操作面を使って画面をスクロールできます。なかには対応しないアプリケーションもあります。


フラットパッドの操作面のうち、右端部分を上下になぞることで、画面を上下にスクロールさせます。


フラットパッドの操作面のうち、下端部分を左右になぞることで、画面を左右にスクロールさせます。


スクロール速度を調整します。つまみを右にもっていく程、画面がスクロールする速度が速くなります。


スクロール速度を調整します。つまみを右にもっていく程、画面がスクロールする速度が速くなります。


スクロール速度を調整します。つまみを右にもっていく程、画面がスクロールする速度が速くなります。


マイクロソフトｮインテリマウス�互換のスクロールを使います。(注)左右ボタンを素早く同時に押すとホイールボタンになります。


ポインタの移動を加速します。


加速無しにします。


低加速に設定します。VGA画面に推奨します。


中加速に設定します。SVGA画面に推奨します。(標準設定)


高加速に設定します。XGA画面以上に推奨します。


バージョン情報


現在の設定によるマウスの左右のボタンの機能が表示されます。


現在の設定によるマウスの左右のボタンの機能が表示されます。


キーボードのCtrlまたはShiftキーを用いて、プライマリボタンからセカンダリボタンに変更できます。


キーボードのCtrlキーを押した後の一回タップは、プライマリボタンからセカンダリボタンに変更できます。


キーボードのShiftキーを押した後の一回タップは、プライマリボタンからセカンダリボタンに変更できます。


ダブルクリックと認識する横方向の範囲を調整します。つまみを右にドラッグすると、ダブルクリックしやすくなります。


ダブルクリックと認識する横方向の範囲を調整します。つまみを右にドラッグすると、ダブルクリックしやすくなります。


ダブルクリックと認識する横方向の範囲を調整します。つまみを右にドラッグすると、ダブルクリックしやすくなります。


ダブルクリックと認識する縦方向の範囲を調整します。つまみを右にドラッグすると、ダブルクリックしやすくなります。


ダブルクリックと認識する縦方向の範囲を調整します。つまみを右にドラッグすると、ダブルクリックしやすくなります。


ダブルクリックと認識する縦方向の範囲を調整します。つまみを右にドラッグすると、ダブルクリックしやすくなります。


マウスのダブルクリックの範囲をテストする場所です。ダブルクリックが認識されると、花が咲いたり、芽だけになったりします。


マウスのダブルクリックの範囲をテストする場所です。ダブルクリックが認識されると、花が咲いたり、芽だけになったりします。


タッチダウン(タッチオン)とするまでの時間を設定します。つまみを右にドラッグする程、タッチダウン(タッチオン)と認識するまでの時間が長くなります。


タッチダウン(タッチオン)とするまでの時間を設定します。つまみを右にドラッグする程、タッチダウン(タッチオン)と認識するまでの時間が長くなります。


リフトオフ(タッチオフ)とするまでの時間を設定します。つまみを右にドラッグする程、リフトオフ(タッチオフ)と認識するまでの時間が長くなります。


リフトオフ(タッチオフ)とするまでの時間を設定します。つまみを右にドラッグする程、リフトオフ(タッチオフ)と認識するまでの時間が長くなります。


座標データの平均化処理の調節を行います。つまみを右にドラッグすることにより、ノイズ等によるカーソルの微振動を軽減することができます。


座標データの平均化処理の調節を行います。つまみを右にドラッグすることにより、ノイズ等によるカーソルの微振動を軽減することができます。


タッチ位置とカーソルを合わせるキャリブレーションツールを起動します。操作方法はキャリブレーション画面の表示に従ってください。


タッチ位置をテストするテストツールを起動します。もしタッチ位置が合わなければ、再度[キャリブレーション]ボタンを押し、キャリブレーションツールを実行してください。


現在表示されている設定項目の全てを、標準的な設定に戻します。


現在表示されている設定項目の全てを、標準的な設定に戻します。